: cyt oe. Seton tye gi Rape. em Ea .

‘Robert t Atchison, JeAL Sovka and R.A. James. - Del Donald Pp Gessaman, former AEC scientist — coe - 2. “Ontario: Hydro. Engineers, in a ‘report’ Ga the’... 22 Dispersed’ as fine’ particles, one™ ‘pound: of” “CANDU; said: “Canada’s approach to: nuclear =~ oe . plutonium: 239: represents the potential for some © _ power has been jess orderly and taken larger risks © _ .° nine billion human lung cancer. doses. Giventhe -. * than the:U:S.: Brogram.” iid » Waneouver Province, - wet _, half-life of 24,000 years, plutonium presents a August 7, i971.) ee 7 SS lajor ‘carcinogenic hazard for the next thousand — u pr - oh aa re a ene : human’ generations.” (Citizens Energy Council, capabilities fs reputation aS z H amnes 5 Alfyen — oe Weg han ae Allendale, NJ. May’ 1975). vs ri “Speaks | for. itself. Pose, Dee: 1976 Nobel prize-winner for. physics,’ says. that es i it ccucial that Mr:'Si belek government mo have’ made nuclear: energy... wo woe 2 ‘ ns : think o de _ * look: economic and competitive: ‘‘The ctucial Harold abel Laureate, foncer. nnclear™ Paper ’s final word on nuclear’ energy hit le. (other -than | safety): between nuclear ..and ' Lap | Ra > 6. — N P “bé:-more. nthe people 1,1 ‘are (and. were Some ="... .. electricity: is the multi-billion-dollar subsidies ‘for | os oe

le ““T mistrust, in'a way, everyone who. fias worked | te May 19 a inanies Bulletin o of the Atomic $ Scientists, a on. the’ problem (of ‘nuclear energy). If we. don’t |

* buitd these’ plants, ‘their efforts .will: have been: | “wasted, thrown away. ‘This leads to a prejudice on. .| ; ae Poe ay ae (op ees a rr acer iene ESS ese rares | ae Leg ne, Boe peor STN Be to trust them. or. reason I doubt what the: . “The: Slitting: of ‘the atom. fias . "chang d- we re ares ! . everything, ‘save Our modes of thinking, ‘and ‘thus: po . eee ee have to say. (Los Angeles Times, < June 22, 1978) we deift toward unpatallelled isaster. wee vat ve or o Co a. a

aw de

Son Senne!

a

ye Hawn. D ‘North ‘Shove ‘News,’ Apa a, condemning § Ralph = Nader and “condoning # nuclear egerey=: : :

“The Union of Concerned. Scientists warned that

the licensing « of nuclear. powerplants with: dubious: 7 -- untested’ ‘emergency core — cooling: ‘systems’ may - <-result in. a ‘catastrophe and loss of. life exceeding 7

anything. this nation has. ‘known.’ ; aan

y William Hambleton, Director of Kansas State le Goole : ‘Sarve v— :

seks ee and other. ‘coun nities

all-you. may have'a longer life and the live will nn -be burdened with the impossibl task of disposin

~ Reports froni ‘Ottawa that,. “Since: ‘th be reduced: ‘allowable doses’ of ‘low-level’ fadiation exposure -by.. 100 ‘per. ‘cent, ‘Canadians: ‘canbe. exposed: legally. to:100 ‘times more radiation from. - nuclear reactors than citizens south of. the border.’ Meee ‘(Vancouver Province, July 19, 1971) © Poe

ae gure > three times the 5 Gotmai-Texsstin it figure of '32, ,000-extra deaths from cancer in: the... nericans feceived. ‘the: ‘Permissible dose” . a

weekends: (ors

‘gach year with burning eyes, (gy (I | Monmane OP Bh yy Bedroom: Ste. - Triple throats | and Sy r shions. Sener Er

| - Been’ sent:to.” all: a, . ae aly ee ; oe | oe “Mainland: councils: ey we a eit. Mean Ha Sealy etl Ce ee “pee Piece: eens ch ow aly, a aly! : a, a oe beahepithih hadi vege “Dinette. Sultes, a _ ene Council: Me “From: opie ee | Speaking: f | : | "concerned cl

the’ burnin a a sprin; var fll be ou ¢ thin 8

of. wepkends: ey a We 3 BM ER Onna Eb — et nr Bee Melt inoked out, cho TA itary PRErIG) HERR RELEASE Roar Mine oe and polfut Re oe | mn bi MOrlle Fura ishings Lid.

‘

( 1

1247 Reiss Road Lynn Valley Te re - justotfhynn Valley Rood | 9BA-9588° .

’ * i ‘

Wide HAH t as mrs pee ely