“Nuclear Regula ‘mission ©. -T. our com! ‘were. i told at a staff briefing." «JAN OF those: 11 already ‘evidence

‘

cae ae ee

y a

x ue :

»; TORONTO - The ‘CBC language ‘network, | said . called = a--trick | play the network used a dif- |

') Thursday nighton Toron- ferent. satellite for . ito tavern owners and left | Thursday night's game : ‘them’ and their, patrons between the Toronto looking the wrong way. —-- Argonauts and the B.C. | Boye IN a ie Lions, won’ by Toronto, i <The: TV. nétwork swit- 47-14. |. are -ehed.-satellites; for | “All I will say is we. transmission of a Cana-. switthed — satellites,”. “dian: Football’ | League Sheehan said. “We will .{ telecast so tavern owners not. comment further were uanble to hijack the because as far as we’ are. signal, = sc Oncerned, the less (those Bill Sheehan, deputy © pirating the signal) know, ‘thead ‘of CBC's English- the better.” oe

+k ho

. DaveChina’

4

“Tree” work’: done’ properly

your - home's

i

your entire property.

of In 25 years in

irates-0 |

have built *a reputation ‘far’ ty tree work . among. thousands of clients, For tree “removal, topping, ormamental. pruning, seasonal main- tenance, or other s

tree work, call. me for con-. “sultation. ‘ My x are. competitive, Iam insured,’

and. free estimates are gladly

922-2200

©, Hf not in when you call, leave

a noesaga and I will call you back as. ‘soon as possible. Lie

as ee AS

Royal Trust since 1899 ‘S Burrard Street phorte 668-506

otk:

6S")

me lite ry

‘s Creme:

Createoa memorable Grstimpression with Wa SPOON IN TERE OOK 4

COSMO RIT R PAVE Rs the affore.

place comerete Edeud fery

WES TO ORS POMa Eg Mae AA dey

proad cae hs Pa wardety od stipes

Cobouudes (COME Torok PRET DE MOG A DOA my wh MPa dere s

te see oy ¢ net, wheesee wegce Diana Vay

hav lyesaar

bio ye uae

palterontive to asahalti or poures

pertio, Sidvessath or siudraniine

AMG