NEWS photo Neil Lucente

CYNDY STONE (centre) shows these three women the correct and safe way to change a tire during a recent Women on Wheels workshop at Jim Pattison Toyota. The workshop —~ which is free to all women — teaches basic car maintenance and will be held every second Wednesday of each month. For more informa-

tion cali 985-0591.

fe better for

ALREADY A huge success in the highly competitive upper mid-size market segment, the sleek Mercury Sable sedan and wagon get even better in 1988.

Significant functional upgrades, including rear seat shoulder belts,

| ul \ 1 fags hea 1 Sage ekeon 8 tage Vat Woe 8 fag Vise 61D Compe fe q a .

6”

a new optional 3.8-litre V-6 engine and an all-new optional premium electronic AM/FM _ stereo radio with cassette player should further enhance Sable’s Canadian appeal. Sable 4-door sedans and wagons receive a three-point rear seat

Bee

shoulder belt system for enhanced passenger safety (the centre posi- tion continues to offer lap belt on-

ly). Other refinements and additions

89 Jeep Cherotee

9 Jeep Wagoneer 89 keep Grond Wagoner

89 Jeep Y's

FEATURING THE ’89 EAGLE VISTA WAGON

SY JEEP EAGLE LINE

HAS ARRIVED

96

31 ~ Friday, September 30, 1988 - North Shore News

THE NORTH SHORE’S NEWEST BRAKE AND CLUTCH STORE!

FRONT DISC $09 REAR DRUM ¢ 99s

aor haniee”*

MOST CARS BRAKES « WATER PUMPS « STARTERS © CLUTCHES ALTERNATORS

e FREE ESTIMATES

¢ 5 STORES IN GREATER VANCOUVER TO SERVE YOU BETTER

BRAKES MOST CARS

Motor Oil

Choose from Premium 10W30 or 10W40 multigrade ol, Both formulated for engine efficiency and performance.

Limit 5 litres per customer.

1 Litre

CXO-10W30-12LP CXO-10W40-12LSP

TO OUR FIRST §0 CUSTOMERS

Glass Cleaner Motorcraft aerosol spray glass cleaner. Limit 1 per customer.

560 g

Cxctag

TO QUA FIRST 50 CUSTOMERS

Gas Treatment

Reduces gum and carrostan Limit} per customer.

250 mL

Cxe 54

CxC-100

sant ved

Se Sas rama TO OUR FIRST 50 CUSTOMERS pete Lia \ ,

““@®{ Windshield Washer xcs A Antifreeze

Concentrated windshield washer antefreeze Lint 1 per customer

litre sug

CXC-47