Friday. March 28, 1397 - North Shore News - 13

joc : - ; ee ian sound receiver with onscreen display. Technics Dolby Prologic surround Lm, Sones |e Preprogrammed multi band remote.

sound receiver. 440 watts = 4 . _ .

0598918 $3AQ = ndiuta inmatsconenercet””” = ** Sale $599 a

& ™“Sale°399 Panasonic.

Technics.

Top of the line Panasonie microwave — oven. 1.2 cu. ft. “Genius” sensor cooking

Panasanie at “ao0 HA Panasonic's best large KS saa: oy ee and sensor defrost. Black or white. . screen TV, beautiful picture, awsome sound! 3 Loaded with features including “Starsight!" Sal 2 2 99

: Soay digital answering machine. No tapes for PRCRERRIs EAL Ca increased reliability. Pioneer surround a : Sa le $7 29 q sound receiver ni ae Panasonic cordless - Sony 32” Trinitron. Bee. eee Dark screen for improved contrast. a [ phone with call display

™ Sale*1199 ee aoe

Technics my stereo slands

5 JVC surround sound system with 5 speakers, CD, double cassette . .

Panasonic microwave ovens 1.0 cu. ft, auto defrost

Panasonic bread bakers from

Sony portable stereo with Sony Handycam “Vision” camcorder with CD, AM/FM, double flip-out LCD screen, 12X zoom.

cassette. Sale $ 279 | ro $108 oale ‘999