32 - Friday, November 11, 1988 — North Shore News

Glenn Hunter Don Hunter Owner

Manager

VILLAGE TEXACG

17 PT. WINTER CHECK UP

. lispect antifreeze strength & test

rity

. Pressure test cooling system and radiator

° Inspect radiator condition

* Inspect belts & hoses

* Inspect front & rear brakes

© Inspect tires

® inspect battery cables & terminais

* Test battery gravity

© Load test batte:

* Check windshield washer fiuid

Check fluid level in brake master cylinder

* Check power steering fiuid fevel

© Check transmission & differential fluid level

® Inspect air filter ia breather

«Check PCV

Tes! all lights aoe Proper operation * Inspect wiper blades

OIL & FILTER CHANGE

1 6%

MOST CARS AND LIGHT TRUCKS

up to 5 litres of 10W/30 motor oil, new oil filter

[ SpEciaLs ExrIRe | EXPIRE [ SpEciaLs ExrIRe | 30/88

NORTH VANCOUVER 085-3611

. SPECIALS APPLY To VILLAGE TEXACO ONLY

| For Quality Service, Guaranteed Workmanship and Competitive _ Prices, phone your Neighborhood Professional today.

“poc” HARRISON MOTORS

| 231 RIVERSIDE DRIVE | NORTH VANCOUVER

TAYLORMOTIVE SERVICE LTD.

174 PEMBERTON AVE.

. NORTH VANCOUVER _985S- 7455 J. WEST VANCOUVER

NORTH VAN SHELL

§ 1250 LONSDALE AVE. | NORTH VANCOUVER

929-7473 J NORTH VANCOUVER

$88-1616

988-4050 i NORTH VANCOUVER 985-7455 J

“TR&T. CAR & TRUCK REPAIR Y

228 EAST ESPLANADE

SURFSIDE PETROCANADA 2196 MARINE DRIVE

‘BRITISH & CONTINENTAL

MOTORS LTD. 174 PEMBERTON AVE.

987-2564 | 987-2789 }

922-6624 |

NORTH VANCOUVER

CAPILANO TEXACO

1801. CAPILANO RD. NORTH VANCOUVER 988- 5288

“BARRY’S AUTOMOTIVE SERVICE

235 PEMBERTON AVE.

| NORTH VANCOUVER 984-4334

“WHITE’S AUTOMOTIVE _

1355 CROWN : 984-9548 .

Cure Front Wheel Drive Engine Shake TORQUE STRUT”

Engine Vibration Damper— Better Than new Car Quality!

In new front wheel drive cars, engine heat breaks down the motor’s anchor strap. You fight engine vibration, rough idle, and balky shifting.

Moog’s patented Torque Strut solves engine shakes. It lasts three times longer than the original strap, with hydraulic and spring action to absorb engine vibration without failure for years.

So stop engine shake. Install a Moog Torque Strut on your car!

1341 WELCH STREET

BILL HAMSON NORTH SHORE PARTS

Miia Ni NTZ I NT 1 a

FEUGRE Ge OEEGGL fF MEe

“OUR BUSINESS IS AUTO PARTS”

NORTH VA !COUVER 985-1113

1425 MAIN STREET 986-6531 § NORTH VANCOUVER 980-4508 §