north shore

IT WAS EXCITING SOCCER Monday as District Firefighters downed North Shore Pegasus 2-1 to take the playoff trophy in the first year of the North Shore Industrial Soccer League. Darkroom captured the league title while North

Shore News lost out to the firemen in the semi finals. (lan Smith photo)

Lge

ii

Le

ROE Ss

ge

LEY Uy ys y by Ge

By DREW FINERTY

District Firemen edged Pegasus 2-1 Monday to capture the North Shore Industrial Soccer League play-off trophy. The win marked the initial play- off championship in the newly formed In- dustrial League, which

got off the ground last September.

Firemen advanced to the finals with their 3-2 shoot- out win over North Shore News two weeks ago Pegasus slipped into the championship match when they upset league champs. North Shore Darkroom, 2-1 also by penalty shots.

In the final at Mahon Park, neither team could muster a consistent scoring attack in the first half and left for the dressing room at the half still scoreless Pegasus keeper, Buzz Zuehlke turned away everything Firemen had to

Including

s

Industrial League final

This Week’s Special

All international Paint Anti-Fouling

offer as did Ray Rogers at the other end.

Wayne Bullock put Firefighters on the scoreboard first, as he scored on a shot from the~- edge of the 18-yard line that found it's way through a maze of players. Bobby Brigham ran the score to 2-0 when he finished off an excellent rush by Doug Marshal with a close-in shot that left Zuehike no chance.

Just when it seemed the Firemen were going to make a rout of it. Pegasus caught fire with a goal from a scramble in front of the net. Bul Grant had crossed a dangerous ball into the penalty area from the corner kick. The ball caused a hectic scramble before Bob Ewings finally got enough of the ball to send it to the corner of the net.

The Firemen will be presented the playoff cup, and Darkroom will receive the league trophy at the league's windup awards banquet-dance this Friday -

6776 Marine Dr. 921-7431