1985 - North Shore News

Slimmer... Milder. King Size and 1008.

NEW:

'S photo Terry Peters

WARNING: Health and Welfare Canada advises that danger to health increases with amount smoked — avoid inhaling.

Avanti —_: King Size: 13 mg ‘tar’, 1.1 mg nicotine; 100 mm: 14 mg ‘tar’, 1.2 mg nicotine. Avanti Light: King Size: 8 mg ‘tar’, 0.8 mg nicotine: 100 mm: 9 mg ‘tar’, 0.9 mg nicotine.

SUNNY spring days entice people out of their winter blahs, (to scenic spots along

the North Shore coastline. Cool, sun- ny days are predicted to continue into next week,

sataberns |

er

camer te

vee