SERVICES

Miscellaneous Home Services..........9201 Appliance Repsirs...vsccaces 9205 CasPenitiy...ecoevesseeseersnerenevnssenoes. 20000 208 Carpet Clearinng.....sssuusesscrrersesesen D207 Carpet hola 9: feramie Tiling.. mneys. Cleaning............ Concrete.

; | Furniture, Repairs & Refi ee 1+ isha he Hettiieg ncensnssecsarsnersnsarscecsnsnesseneeene 224 iatesos DeSI ZT essrersncreccrsrassrsesanen I ZO NURETERE onveneorecorneonnenene Landscaping ..-r-ssecceresesssrseoresorseeees T2268 Lawes & Gar do0r....cesersscronerserreveene G22) Maseniy.... sosaarsasesescenseessoes $228 MOVER gneve seneesensesemseetrecrrsssesssenseees TREO Paint & ft ieaipape...... een <1) Paving & Sealeosting....cscssrreseosennGSd, Paving Stone Instattations...............9232 ~ Plumbin sassssseessnees I 233 Peal FE Nt me BSE ones a Renovations & Heme Improvemants9236 ROOTING ..nseveseonsvesssersesssereessecansoces Rubbish Removal... eissorsecesseeeneee F238 Ln: 7

sseosrevensesesreretetinrernanenssaceestes QHD

TOG Sblbcerenseoertnenrsunaresnreaee Tre SMCS erence snrnennecrnran 9242

anescasesseerrnseratssseensesssnnness IZA

Upholstery ..... Window Cheamimg......esssosorsssceervereeee 9243

ADWERTISERS ; Please check your Classified Ad on the - first day of publication. The North Shore News requires notice of error before the second insertion. "Make Goods” will not be granted on minor errors which do not “fessen the value of the whole ad. Call 986-6222 to have your ad corrected,

1 interior Designs

NID COSTLY MISTAKES with

"New York Designer. 988-3830. i's WHAT-YOUAVE INTERIORS. EDGEMONT INTERIORS “Exactly what tad in mind"

Chimneys

SCREENS BLINDS s Blinds, Screens § jeather Stripping . Lowest Price Windows & Doors Screens, 50%. OFF ALL KINDS OF BLINDS. Open after office hours. Free estimates. 464-7527 or 464-3578

AUGY Appliance Repairs

& ACTION APPLIANCE REPAIRS x All makes including Inglis, Kenmore Low rates, Dedicated Service. Free estimates © 984-1825 ALL APPLIANCE Repairs. Guaranteed. Washer, dryer, range, dishwasher, etc. North-West Appliance 987-9759.

APPLIANCE SERVICE Fast, Reliable, Dedicated Service. Cali Rob, 988- 2360

9206 Carpenty

A VERY hardworking carpenter Sooking for work, Reasonable rates & free estimates. 686-2133 or 986-5869. ASC JOURNEYMAN CARPENTER (Tim) Fine Finishing, Shylights, Stairs Complete Services & More. 984-1875 875 ALL TYPES OF QUALITY CARPENTRY wality Construction By Design Jim 987-9504. toll-free pgr 1-978-5193 CARPENTRY, REMODELLING Foundation, framings and finish Excellent references, Pager 667-3295 EXOERIENCED CARPENTER QUALITY WORKMANSHIP Call 985-7262 EXPERT CARPENTER. Carports, decks, stairs, general repairs & renovations. Call 986-9675.

Classified Ads are where the serious shop and save. 986-6222

~BLUERIDGE CLEANING (1979) Truck mount carpet & upholstry clean- ing. Trained, certified technicians. Stain resist fabrics our specialty. Quality work at reasonable prices. 987-3582

out of t town uesis? Want your home to look its best?

call

*Steam Cleaning Truck Mounted Carpets/Furniture Living Roam/Dining Room/Halt $39.95

EXPERT CARPET CARE 987-9303

STEAM-FRESH CLEANING

Guaranteed work. Deodorizer included. 2 rooms or sofa

$39 SEREDAY 986-9369

Carpet 4 installation FL CARPET REPAIRS expert. 27 years

" experience. Power testretching. Free

estimates. Greg, anvtime, 987-7977.

CARPET/LINO INSTALLATION New & used, feat fe-stretch Leo: 987-6870

CARPET & Flooring installation including power stretching & vinyl tiles. Free estimates. Call Bob 984-3165

EXPERT CARPET installation. Repairs & testretching. Serving the North Shore since 1981. Peter 3 0-3127.

} ; Ceramic Tiling

ACTION TILE Co. 20 years experience in ceramic & marble tile installation. Rea- sonable. Mike 921-8106 or 844-2071. J.), THLE & MARBLE Professional installation of ceramic tile. We also do pools, glass blocks etc. Quality guaranteed. 987-2046 LOWER MAINLAND CERAMIC TILE Ssles - Installations. Showrooms: 108 West 2nd St, North Van, 980-1234 636 Commercial Dr, 251-1938.

+ A BEAUTIFUL CLEAN House & Laundry Personalized service. Money back Guarantee. Susybodies 926-5617 Al HOUSECLEANING Service. Serving the North Shore for 8 years fully trained and reliable. “You know it's clean when you see the daisy!” Pager 650-4776 BLUERIDGE CLEANING 1979 Highly personalized quality service. References available. 987-3582. CORIC’S JANITORIAL SERVICE Residential. Commercial & Industrial. Satisfaction guaranteed. Great refes- ences. 7 days/week, Albert 985-2464.

DUSTBUSTERS 925-9357

HIRE A STUDENT for top quality reliable housecleaning. Affordable & experi- enced. 988-8242

NEW BROOM. Husband & wife. Resi-

dential, commercial, 7 days/week, All -

cleaning products/equipment.987-6689.

NORTHWEST JANITORIAL Building Ser- vice. Speciatizes in construction, carpet cleaning, office cleaning & tiles.

Free estimate. References. 988-1618 SUPER CLEANING fady. Mature, reliable, excellent references, Reasonable Rates. Call 984-7422 after 5 p.m.

SWEEPING BEAUTIES INC 1988. Total

cleaning service. Commercial & residen- .

tial. Fully trained, insured & bonded. Flat sate. Free estimates 987-5850

Concrete

A-E QUALITY CONCRETE SERVICE Specialize in exposed aggregate, drive- ways, stairs, patios, garages, founda- tions. Commercial/Residential.

EUROPEAN CONSTRUCTION INC. © Concrete specialists © © Forming, placing, finishing & repairs © Swimming Pool and Spa Installations & Repairs Call John or Isaac, 240-5059 MACEY & HORRISOR Concrete ltd. Concrete Placing & finishing. Driveways, patios, sidewalks & foundations. Prep & form work. Sseciatizing in exposed ag- gregate. John 988-2840, Gersy 986-4513

RICK MASSONE Roch wall, cement driveways, patios, sidewalks, interlocking, 985-6817.

yave Contracting

ISUMGTON HOMES New houses, renovations,

additions & improvements. ____ Cait 986-8630 fos estimates. J.B. CONSTRUCTION Renevations, Decks, Additions. Framing crew available im- mediately. 989-2333 leave message. TWIALIME CONTRACT BUILDERS-we care 25 years experience providin, ng oo mplete construction services. Tony 987-404

£3! f Drafting & Design r

aTUS DESIGN & Construction. House plans, project management. Additions, senovations, custom homes. 929-5841. ORASTING & DESIGN

30 years construction experience. Turn your concept into reality. Residential © Commercial © Renovations. Phone Roland, 291-2045 or 988-2910 eves.

921 4 Drainage

Tamihi © 986-7815 Drainage ¢ Sewers © Waterlines 24 Hour EMERGENCY Service

ASAMILLWOOD . QUALITY DRYWALL SERVICE Repairs, renevations, new construction & textured ceilings. Prosnpt service. Free estimates. Richard Wood: pager 844-4226 or 986-9880

A BETTER ORYWALL JOB BY BEST BOARDING & TAPING CO. LTD. © the magic mudders © Guarding, Taping, Textured Ceilings Free estimates © No job tos small 980-3080 Pager: 680-2031

A COMPLETE drywall service. Boarding, taping, textured. ceilings. Sma!l jobs welcome, 984-0711. AACRON DRYWALL SERVICES. Complete Orywail for new construction, repairs, renovations & Spraytex. Quality work. Free estimates. Call John W. Sadler. Pager 631-1510 or 980-0769.

ALL PHASES OF DRYWALL Quality repairs & senovations Textured ceilings & painting

WALLMASTERS

Bruce 987-0731, cellular 649-4866

FOSTER DRYWALL - Renovations, repairs, textured ceilings. 25 years an the North Shore. Harold Foster, 80-9988

Electrical

“a CERTIFIED ELECTRICIAN Small jobs preterred GEM Electric. Lic 4495) Dave 926-5847

ACT NOW. Experienced electrician. License 417140. Quality work’ Retiable. References. Action Control Technologies Inc. 929-0352 pager 643-9898 AMPER ELECTRIC License #10776. ALL AND ANY ELECTRICAL NEEDS. Call 926-7335 or pager 443-0030. Placing an ad in the Classified is so-o-0 easy. 986-6222

F927 Excavating

SUPER-TY BOBCAT & DUMP TRUCK SERVICE _Eall Tyler at 92 S151

~A TFERCE? DECK? OR REPAIRS? Free estimates. Calt Seymour Fencing & Decks, ask for Gary at 984-6973

AFFORDABLE FENCING Cedar fencing. decking. estimates. John or Paul ig 6669,

GOOD FENCES Fence first aid and replacement. Free estimates, Call Bob, 980-1506.

PAUL'S FENCING. Quality #1 cedar fen- cing. Reasonable rates. Free estimates. 7 days/week. 987-764, Cellutar 351-6509

IRON WORKS Railings, Security Bars, Gates, etc.

call 980-4747

9219 Floor Coverings ALCETA EUROPEAN HARDWOOD FLOORS

LTD.. New floors and renevations. Call Showroom, 432-7710, for appointment.

BUSY BEEZ QUALITY TILE YOU design it!

lll create it!, FREE estimates. Refer- ences & pictuses available. tndoor/ outdoor. Work guaranteed. Calt pager 24 hours 891-4516. Leave message. FLOOREX FLOOR Professional installa- tion of hardwood floor & ceramic tile. Refinishing, 525-4379 or 220-3501. WASREN KAROWOOD floors. Old floors

repaired & refinished. Hardwood floors installed. Free estimates. 988-8328

PEON Furciture, Reps 9220 & Refinish ishing WOODAGEN

Refinishing, Repairs & Restoration Fiauas a Specialty 988-0100.

GUTTER SYSTEMS Installed © Cleaned > Repaired

876-4604

NORTH SHORE Gutter & Roof Cleaners. Clean gutters before the rainy season! ___Free estimates. 984-0238.

9222 Handyman

CARPENTER/HANDYMAN Roofs, renovations & small home repairs No job too small.

Free estimates. Cali Daniel 987-2109 EXPERIENCED HANDYMAN Framing/Painting/ Drywall Please call Dan 985-0561

EXPERIENCED HANDYMAN - plumbing, fencing, drywali, concrete, painting. Free estimates, Call Ati 980-5482

HANDYMAN SERVICE

Carpentry, d all, painting, all repairs FREE ESTIMATES 341-6486

KEY WEST HOME MAINTENANCE © painting © tile work © carpentry © any repairs Quality workmanship guaranteed 935-3803

MONK HOME IMPROVEMENTS Carpentry, plumbing, «electrical and painting. Free estimates. 987-5414. Ciassified Ads mean results. Call 986- 6222 for more information

A. BELL DISCOUNT RUBBISH REMOVAL. Large truck for mini & mig hy loads. Reasonable. Same day/? days. 922-5101 A COLLEGE student available to haul tubbish etc. From $25-LOAD plus dump fee. Free estimates. Kevin 986-3952.

A POOR university student with truck

will haut rubbish & do small moves. —

Free estimates. Geant at 230-2737.

DAVE’S DISPOSAL Fast, dependable service 7 days/week. Very thorough and reasonable. 926-5206 Celt: 328-2681 ECONO HAUL. Huse tsuck & men avail- able to haul away large or small loads. Reasonable. 922: 228 Cell: 644. Waa

7 Kitchens

KITCHENS & BATHROOMS CABINETS

Custom or refacing, direct from factory. Counter top specialists. Superior Covetops, 3470 Commercial Dr. Open Sat & Sun, 10am-2pm 879-919} Over 30 years in business. KITCHENS & BATHROOMS. Specializing in cabinet refacing, modifications, couatertops. Professional service for 15/yrs. New-Look Kitchens Co 298-3228

NORTH SHORE COUNTER-TOPS & Arboriting. We guarantee guality work. Free estimate. Catt 987-9908. VANSTAR WOODWORK & DESIGN INC. Quality Custom Cabinats

Finish Carpentry Kitchens *Offices @Retait

___ 8806901 or 686-4553F age)

KITCHEN & BATHROOM RENOVATIONS ¢ Plumbing, electrical, drywall * Ceramic, decorating. etc. _ Excelent References A

Jim Mitches : &

9225; Kitchens

FURNISHUNE EURO GLOSS EUROPEAN STYLE KITCHENS AND CABINETRY

FREE ESTIMATES SENIOR DISCOUNT

; 291-8834 am €& Hastings, Bby

CANYON KITCHENS

9221 eX Landscaping A GARDEHER'S TOUCH University Students

Fencing, Decking & Landscaping Call Pat ar Bruce 926-3840.

AFFORDABLE QUALITY

Major Cleanups @ Lawn installation Retaining Walls @ Garden Design

TOTAL LOOK LANDSCAPING |

929-6431

AFFORDABLE LANDSCAPING. Clean-ups, Hedge ? Shrub care, Pruning etc. Professional care. 985-7977.

BARK MULCH Topsoil, manure, lava roca, sand & grav- el. Delivered, 581-5457. BRUNO LANDSCAPING

Rock wails, cement werk, turf,

shrubs & paving stones. Free - _ estimates gladly given. 986-0733

CALIBRE LANDSCAPING Complete garden services. We design beautiful gardens-naturally. 922-4355

COMPLETE YARD SERVICES Tree & hedge work. new lawns, yard cleanups, landscaping, digging, heavy labour jobs & more! Free estimates.

ave 929-6924.

CONTRUCTIVE LANDSCAPING @ Stone Walls © Paving Stones ® Bricks & Blocks Professional courteous service 20 years experience Cellular 250-7824 or 980-8224

CREATIVE LANDSCAPES Excellence in Design Complete Installations @ Fencing @ Decks @ Tie Walls ® Tree Work @ Clean-ups ® Maintenance @ etc. Free estimates 987-0267 A company with pride!

GREENSLEEVES GARDEN GROOMING & LANDSCAPING For Paving stones, Retaining wails, Lawn & Garden Maintenance and Complete Landscaping, Call Alden 980-5994. Frey Estimates.

M.B.R. LANDSCAPING & TREE SERVICE LTD. Lawn Care - Retaining Waits - Fencing

Free estimates. 19% discount to seniors & handicapped. Please call Major

1-880-2397 or pager 650-1343 REAIG LANDSCAPING #1 Turf, retaining walls, driveways & related duties. Call famo at 299-8532.

WALLY'S LAWN & Garde Maintenance. Cutting, pruning. weeding. power taking, aerating, yard cleaa-up. Call 987-4644.

FLAGSTONE - LANDSCAPING

. ° Landscope Construction & Design @ Complete Lawn & Garden Maintenance : 737-RAKE (7253) Free Estimates

. ing, Hedge Trimming, pandsca ing, - Turf "eS

AA. SUMH Landscaping. Garden service, :

power rake, aerating, prune & trim. Clean up & top trees. 934-1988

A RASH Landscaping. Gardening, prun-

ing, trimming, power rake, laws care, |

tree tap, geneval clean-up. 985-4622

AFFORDABLE LANDSCAP:NG. Clean-ups, Hedge & Shrub care, Pruning etc. Professional care, 985-7977.

ALPINE GARDENERS o%, LANDSCAPING

Lawn & Garden Maintenance

° Lawn & Landscape Installation @ Yard clean-up @ Pruning

Friendly, Professional, Prompt Service

FREE ESTIMATES CALL 984-7358

ARE YOU tired of spending weekends doing yard work? For complete profes- , sional landscaping and maintenance call ° Bill Diett at 922-2224. References,

CAN'T SEE your garden for the weeds? 2 Mmaie caucasian gardeners to de lawn : Maintenance, pruning & ‘weeding, - clean-ups & rubbish . removal. Free | estimates. Mason Hayes . Landscape Maintenance. 998-0499 : CLEANUPS :EDGES/ SHRUBS TRIMMED . Complete Lawn & Garden Services. _ Helpful Home Services. 980-6155. COMPLETE YARD SERVICES - Tree & hedge work, new lawns, yard » cleanups, landscaping, digging, heavy ; labour jobs & more! Free estimates. : Dave'$29-6924. a EXPERIENCED JAPANESE GARDENER Weeding © Garden deanup Call $26-7151.

GREEN BROS. Landscaping, tree service,

hedge trimming, pruain “and We eh irae

maintenance. 9,

INCREDIBLE RATES! - Clean-ups, pruning. jweeding. pass cut- ting, festilizing etc. Dermot 984-7013. JAPANESE GARDEHER 996-8126 _

Garden maintenance, clean-ups,-Trimen- ; 4 ing, Landscaping, Low prices, Gcod job. Free Estimates. 19 years experience : JIMS GARDEH SERVICE - Specializing - in pruning, yard Clearup, fawn utting &, monthly maintenance. 922-7195."

MCPHERSON GARDEN SERVICE

Sesving North Shore. Good rates.

925-9197.

MW GARDERING Hedge” “Timning all: Free edi yard clean-ups, maintenance. . ree estimates. Mike 980-9196 - ;

OLYMPIC GARDENING. Clean up, Prune .:

installation, Garden &: Lawn Lean, 985-0326, Ceil 880-3534. . S & W GARDEN and Landscaping...” Service. Maintenance & Clean-Ups. - : Japanese Gardener. 986-0059.

ices. °

_ STUDENT. GARDENER with pickup & 1. - - Ton Van. Clean up, landscagin,

rubbish temoval. Deliveries, Lock 926-5283

STUDENTS. WiTH. Equipment will a yardwork.. References Available. Protes- © sional ual Call Flask 869-5498. .

TURF 99% vaRo | High Guality. 328-6894 |

Ps “Y BRICK BOIS WORK - Gimes fepiaces ne * tacings, glass_blocks,_ tiles.. -sepaits, Free estimates. Andy 926-5693 « :

New 8. -

ALL TYPES of brick, block & glass. blocks. New & Repaired. Also chimneys

sebutit. and re-pointed.-20 years expert : ence. Call Kevin 929-5189. ~

BRICK, ROCK & tile work, rock walls concrete slabs & sidewalks. Try us on all

types of outside work. Call 980-1838. -

C. PEZZERTE LANDSCAPING Rock walls, concrete work & new Jawns. Free estimates. Chris, 987-1005,

CONTINUED ON NEXT PASE

CHIMERO BUILDING MAINTENANCE

Let us clean your office or workplace while you sleep

— Daily

-— Three times a week — Twice a week

— Once a week

— Weekends — Bi-Monthly — Monthly

We also maintain stairs and halls for apartment buildings.

Call UGO for free estimate Tel: (604) 430-4263; Pager: 1-977-8663

“We love what we do.”