47 - Friday, August 23, 1985 - North Shore News

RAY PROC 984-9711

Cc

wit

|< Oat EAGLE ISLAND Deep water year round moorage. Power & water

UPPER LONSDALE

Immaculate 2 bdrm. corner unit in Coventry 3 ‘ f “tree ino? ee House. Top floor, woodburning fireplace, in-suite 0 Private 40° dock. Smashing bachelor home, = omeneinitee

SKYLINE DR. ae . A ken ja iin bd B iul vi . Nee ; laundry, vaulted ceiling, spiral staircase to loft. SUNKen jacuzzi in bdrm. Beautiful views of Eagle 2 BDRM. — MINT g Mint 3 bdrm. rancher. City view — backing onto Very very nice — adult oriented. Harbour. Beautiful suite, facing north. Family expansion J

ravine — very private. YP forces sale. Nicely decorated — open for offers. | 114,900 |

FANTASTIC — .87 ACRE - ‘ . ; te LOOKS ARE DECEIVING .

F © 2000 sq. ft. three bdrm. rancher ¢ Huge fami- Character oldie in fantastic condition. 4 bdrms., & 2 full bathrooms, large kitchen. Beautiful hard-

wood floars, full bsmt., 50x170" lot. Reatly neat i inside.

gorgeous pool setting * An entertainer's delight

— like skinny dipping? : ot RE SKINNY SIPPING 618 WEST 22ND

Absolutely immaculate 2 bdrm. with full bsmt. Beautiful hardwood floors, new carpet in bdrms. Rec. rm., workshop, storage, 3rd bdrm. down. Private street, fully fenced & Hot! Hot! Hot!

: age b

ral

SUPER RANCHER New carpets, new designer kitchen with built-in microwave oven. Hot tub off master bdrm., semi- § ensuite. Huge skylight in tiving room, profes. sionally decorated — stunning.

o THREE BDRM. CONTEMPORARY Low maintenance fot. Fully developed on both i floors. Skylights. lovely city view.

2541 MAHON AVE, * Absolutely delightful 3 bdrm, rancher » Large kitchen, fenced yard, new gas furnace *® Close to schools & shonping « Part basement « Tastelully decorated — you will love it.

CHARACTER OLDIE 1063 DUCHESS 1560 McNAIR PL. 104-120 WEST 17TH Fantastic condition. 2 bdrms., fuli bsmt., fantastic Ambleside character oldie, lots of potential. Three immaculate 3 bdrm. unit. 3 bathrooms, full Large 1 ddim. unit in the Old Colony buttding. view. bdrms. on top floor, guest suite down. Fantastic developed bsmt.. gas fireplace. large kitchen, Lovely view of Grouse Mtn. Shows very well. view of West Van and water. pool. Will sell quickly.