Your Business

Priding themselves ina

[t's a high tech world out there and it's moving faster than ever.

Competitive businesses today require strong. reliable technical support to ensure thal daily activilies aperate smoothly and efficiently.

Micro Infiniti Computer Inc. has The Right Solution every time. They specialize in corporate ser

support guaranteed to keep you up ani running,

MOBILE COMPUTING SOLUTIONS

FufiTsu

4 LIFEBOOK 735DX

© 133 MMX Pentium Processor

*16MB SDRAM ° 2 MB Video Memory ¢ 3.6 GB Hard Drive « 20X Max CD-Rom © 56K Fax/Data Modem

| SATELLITE PRO

446 CDX f° 133 MMX Pentium

Processor ,

¢16 MB RAM io

¢ 1.3 GB Hard Drive @

© 12,1" HGA ; Display ;

* 2 MB Video Memory

¢ 16 Bit Stereo Sound, 2 Speakers

*A4ll Toshiba Models are in Stock

proactive customer approach. Micro fafinitii offers a wide selection of products, great prices and sBperior service, Whether it's corporate. honvw or sinall business. Micro Infiniti offers benefits vou can't afford to do withoul. Their new store location is centrally located with lots of free parking available. A wide selection of desktop. portable and network selections are

on display.

A knowledgeable sales staff is complemented by highly qualified Novell Certified Engineers and Microsoft Certified System Engineers, Clients can count on peace of mind when choosing Miero Infinitii. their dala protection and networking solutions mean you can countona more efficient business enviroamenat.

Ask about their multimecdia and digital imaging ideas, These tools provide vou with the means to deliver more powerful presentations

¢ K6 233 Mhz MMX- Enhanced Processor 4

¢ 32 MB Sync DRAM

¢ 3.2 GB Hard Drive

* 24X Max CD RAM Drive

* K56 Flex Modem .

¢ 15"IBM SVGA Monitor

¢ Lotus SmartSuite

Kodak

Seethas » crevice ~

DC 20

* Just point, shoot. then

quickly and easily

upload images into your computer £7) Stores up to 16 standard photos «everything's included for

one low price ~ camera,

software, batteries

and cables

DC 210 ZOOM DIGITAL CAMERA

© LIS2x864 pixels per image produces dazcling high resolution images re +4 MB removeable memory card stores up 60 images * Includes: Adobe Photo Deluxe. Adobe Pagemil!

and develop a better company image.

And when it comes to keeping up-to-date, Micro Infinitii will be pleased to introduce you to one of the newest portable solutions now priced to move for less than $2000.

When it comes to efficient servicer and selection. you don't want to gamble, Count on Micro Unfinitii because after all. when you have expert: on your side. you're guaranteed to get the sight solution every time,

Better NETWORKING means more EFFICIENT business

SOLUTIONS PENTIUM SYSTEM

NETWORKING SOLUTIONS 2 COMPUTER

Intel 166 Mhz MMX Processor

*16MB EDO Memory 9 -~ ¢2.1GB Hard Drive . 4X CD Rom Drive * 16 bit Sound Curd & Speakers * Fux/Voice Modem ¢ Windows 95 °3 year warranty

PENTIUM II SYSTEM ¢ 266 Mhz MMX Pentium [1 Processor «32 MB SDRAM Memory * 3.4 GB Ultra DMA Hard Drive *4 MB ATI3D Xpression+ a Video Card . * 56 Kps Voice/Fax Modem * Windows fe 95 CD sil)

¢3 yeur warranty

AXELL Recordable CD Disk IOMEGA 100 MB Zip Disk ARTEC VIEWSCAN Hand Held Color Photo Scanner

024 Bit capatebty reader ap te 1? mister true cotots. a bull colin, pray weale inchades OCR, phot tor ker peesplus

56K INTERNAL

Voice/Data ax Modem

COMPUTER

_ >The right: solution everytime.

1030 W. BROADWAY, VANCOUVER

Includes: * Two Ethernet network interface cards with BNC connectors ¢ One coaxial Ethernet cable ¢ Two terminators - 2 GS ee aa. FREE t-hour Network a © Prvded by a Cemtied (hic ° Netwate Enginees! ROxcurms wepwirate sales Weepreentanve" “ wm UStar certified perunnel on band

“Mu “pre

OfficeConneet Networking kit » for (0 Base-T Ethernet Network ¢ 3 Kiherlink IW ISA Network Interface Cards

¢ OfficeConnect 8 Port aoe y :

Ethernet Hub * Complete Cabling © 3Com Lifetime Warranty

SE RIND US $4 89269 IBM, Canon, Lexmark, HP 4 oO” }

Toners/cartridges TARGUS 415%! $34 :

Carring case

FUJITSU paim Mouse

A unique pointing device for portable computing and presentations

IN Customer Service Hotline: 604-737-0790

Fax: 737-0791 Internet: www.mi-canada.com