28 - Wednesday, October 19, 1988 - North Shore News

SAV FOR THE WINTER SEASOR!

ke were Naalin aad y ot ke Teal} BASE,

WESTCAN

BASEBOARD HEATERS

Comes with terminal box on each end, uses standard 75°c wire for power connection. 240 volt. Thermostats can be installed in either right or left hand junction box.

NORTON ls BEE" : 26 INCH. soow. 3837-307-1 BASEBOARD ae oe a. | SAVE 6.00 THERMOSTAT | = Bs

Snap action switch and bimetallic sen-

sor provide accurate temperature con-

trot. No contact arcing. ‘“Comfort S - ot : « 3 25.99 ea. ** indi . 3837-030-50 : : ee

Zone lnclicator. 3 ares . 1 J 40 INCH. 1000w. 3837-325-1

SAVE 4.0 : 14 feserci a | || SAVE 16.00

, oa

DUSTOP

PLEATED

jONIZATION =|. “|] Ego oe oc | FURNACE FILTERS|

SMOKE | re aa “ ; sn 5 : Ae % , are 2 to 3 limes more efficient than DETECTOR 2 i 3 99

Protection for your family. Batteries in- 16x20x1 REG. cluded. 3610W827-10 §522-222-12# 6.99 ea.

P Se Oy - 49 SAVE 2.00 es _ _ oie a : : 3522.040-128 #48 ea. 3522.281-124 748 ea.

20x25x1 29

5522-259-12# 7.99 ea.

}CAULKING GUN | “Sp "Pico. | WINDOW AND 4 Standard size. 2034-033-24 a : _ ; | = : F ~ . | DOOR SEALANT SPECIAL “NA TE AS OF | wine 20381740

SPECIAL

99

” REG. 7.99

HOME

HUMIDIFIER PADS

Replacement pads. 90-S. 5545-261-50

WHILE QUANTITIES LAST! jj , ay : cae |: 1 2280, Z : 28k. a SS REG. ° 4.69

TAYLOR I: ee a - PORE : | HOME SEAL

HYGROMETER/ |. | | | . : THERMOMETER | | ye | , ee TAPE gms

For indoor humidity and temperature vinyl, etc. 48mmxtOm. 5540-186-50

season Wee ||| : | HOME VALUE

HOMECARD, MASTERCARD, & VISA ACCEPTED AT MOST HOME STORES

Now at the North Gamier Hardware Gus’ Hardware. ‘Shore Home we ieeRVancowor «260 Mount Soyeut Patey

988-8010 929-1814 —

~ Hardware 98 “ested “store nearest | Pearson's Hardware Simpson Hardware :

; West Vancouver

YO 988-0838 __ SeA8