Paneer

.

. : . | Page 8, March 21, 1979- North Shore News | . | “Quality Service Assured" |.

- 986-5122. 1189 West 16th St. - N. Vancouver” - (one block south. of. Marine Drive; | just off Pemberton. BCAA APPROVED i

y

-

‘Treating your car right =| MECHANICAL’ a “2. Control Linkages: | The - |. 1. Heat Riser Valve: This flow of gas to the carburetor pre-heats the fuelair mixture is regulated by the gas pedal; to aid in proper combustion. they are connected with a

Aut * Special ci ists _~ | It ‘should. be checked to - series of linkages. A simple

ipanese ensure that it is not stuck. inspection -will reveal loose

- IKENAKAYAMA

lubricated and/or tightened. '

| 3. Compression: As the piston moves up inside the . cylinder, it. compresses the — air-fuel mixture.. This’ : compression should be

: @hecked to ensure it meets -_ | manufacturer's. specificati- . wy ons. Low compression could indicate worn valves or. ' piston rings.

da OVER } - 1500 DEALERS . | IN NORTH

; » : AMERICA | Cie

Wa: GUARANTEE

(FULL LIFETIME WARRANTY)

ON THE

MUFFLER, TAILPIPE, EXHAUST PIPE

4. Engine Mountings: A Ea broken, loose or damaged OR motor mount may be hard to XN me 4 inspect but could be Neh fae = dangerous in that it could oS f- cause the throttle or -other - mae linkages to stick. They : should be inspected yearly.

_ELECTRICAL

a

1. Alternator: The alter- I= =p

nator, (or generator in older NW

cars) supplies the electricity h » INN Hy Z3

. eee N allay > \. for most of the electrical [ili iy iN Wy ‘. functions in the car (lights, V7. aN) Cl

(LIEFTIME GUARANTEE) «© COMPLETE BRAKE REPAIRS ¢ COMPLETE ENGINE OVERHAULS ¢ SHOCK ABSORBERS ¢ COOLING SYSTEMS « AIR CONDITIONING

ati’

FACILITIES TO WORK ON ANY KIND OF CAR ALL WORK GUARANTEED

(Whulda t you rather pey boss)

SOUTHSIDE oasov

290 S.W, MARINE DRIVE, VANC. 9, um 324-4644

Grout Motors Ltd.

1519 Clyde Ave West Vancouver

922-3231

We like to keep a good thing going! We are Open Mon Fro 8 5pm Sat e apm

Ail Wi UA accessories, etc.). A ut UST lp WN WN a WALTERNAIE. HOUSING AV NEST alls AND [ ABORI It also charges the battery I ethe ee t = N =I WY ae _— - -when “necessary to ensure — FOR AS LONG AS YOU OWN that it has enough power to 2. Voltage Regulator: Asthe levels. The voltage regulator YOUR AMERICAN OR FOREIGN CAR! start the car. It should be engine operates under regulates the power output -. ——— ; JUNK CAR |. checked to make sure that ,different speeds, the such that the stream of TORT ow mA NT its output is strongenoughto alternator also runs at lectricity is constant. WestVan Sve 10% . PICK-UP carry Pout thee functions _ various speeds and therefore CONTINUED ONP AGE 69 tk @&, a. HO | LIVINGSTON’S , expected of it. generates power- at uneven " ; AD SS . ee we en ee ee Shell Service 926-3281 | | ZA HOUR I 7 . | ! =< sox) | Az. TIDY CAR ze Dr eet} | 437-3063 || ) | i Associate dealer Tom Turner xKeeeeeeeeeeeyeyeyeeyeMRYEMR KERR featuring ' | aa = | | . 7 BUYAT9DATSUN—s Presery-a-shine . x | Never wax your car again | Th 5 , | om “ : . oO ff master charge | ANDWE'LLCROSSYOUR | Tris coupons worth 18% ot GD * . x _limit one per customer ’ au x -. : e : F Estimat , PALM WITH GOLD iH | Call now for a Free Estimate | ' $ | 986-2178 4 * = * * | - . ‘ ‘ epartment * * ae mS ok fi, ge tees * « Se + va * x * | : * * «x * *} | « *« * * « *« * ‘& OFFEREXPIRES , * ? wo ) o wee * 5 MARCH 24th, 1979 ; +" e IMPORTS ¢ DOMESTIC ¢ FUEL INJECTION ¢ DIESEL ¢ EXHAUST os * * * + + « * + * oe +* + * « *“ -

a_arwre LEASE RATES AVAILABLE CESS