pee sa / ‘, \

A 4

Mathers { ty

WETICE

THE FOLLOWING is a list _of recent: North Shore emer-

‘gency ‘incidents:

IAN WILSON

‘> FULLERTON Esso 1901 CAPILANO ROAD OATH VARCOUVER

984-9194

30th.

SPU ae rhea TT ANNETTE sraseanenireasen ives ae vate FC

Inglewood

AEN LVDG JHE WAL ODMH EAE SW MafDSLROY RCE St BEES ERENT EO

Number of routine calls: 5 Number of Code 3 emergency calls: 3 (2 collapses, | shortness of

breath) Nov. 21 Number of routine calls: 0

Not available to press time.

Nov. 20

Village Esso will be closing Nov. | would like to thank all my Friends & Customers for their

dedicated patronage.

lan Wilson has my full confidence to look after your automotive needs.

FOR AFREE WAND WASH

with 25 litre fili-up please visit me at 3rd & Chesterfield Esso

flor. Ht

GLENN HUNTER

oO"

. unt, yee

Number of Code 3 emergency calis: 2 (1 fall, 1 chest pain)

Nov. 22 Number of routine calis: 0 Number of Code 3 emergency calls: | (collapse)

Nov. 16 Lions Gate Bridge. Four-vehicle chain reaction to stop in bridge traffic. Approximate-

ly $8,400 damage. No injuries.

Charges: following too closely. Nov. 18

Westport Road and Westport Wynd

Vehicle lost control in heavy rain, crossed road and struck power pole. Approximately $8,000 dam- age. No injuries.

Starlight Billiards.

Robbery. Two East Indian males threatened to hurt the complainant if he did not give them his money. No weapons seen,

Number of medical aid calls: 7 Number of false alarms: 4 1300-bIk. Charlotte Rd. Investigation. 800-blk. Forest Hills Dr. Residential fire. Capilano Road and Marine Drive Motor vehicle accident. Nov. 22 Number of medical aid calls: 3 Number of false alarms: 0 Highway 1 Motor vehicle accident, Mountain Hwy. and Keith Road Motor vehicle accident. Dollarton Hwy. and Riverside Dr. Motor vehicle accident.

“Ramsay Road and McNair Drive

Lines down. East 21st St..and William Avenue

Pole/transformer fire. Phibbs Exchange

Motor vehicle accident.

Nov. 23

Number of medical aid calls: 5 Number of false alarms: 2 Riverside Brive and M¢. Seymour

Montroyal

SA praveme tam rosea

Motor vehicle accident. ke West Osborne Road and Norwood: Avenue

Motor vehicte accident. "’:. Riverside Drive and Mt. Seymodr Parkway

Moior vehicle accident. | 2600-bik. Bronte Dr.

Rescue. . : Mountain Hwy. and Main Stree

Motor vehicle accident.-" 800-bik. Premier St.

Fire.

Number of medical aid calis: Number of false alarms: 3 100-bik. East 15th St.

Smell of gas. -." 500-bik. East 3rd St.

Fire. 609-bik. East 22nd St.

Smell of smoke... : 600-bik. West 23rd St.

Child locked. © 2 ~ 100-blk, West 21st St.

Faulty lamp. ©. Nov. 22 Number of medical aid calls: 3 Nuinber of false alarms: | Highway 1

Motor vehicle accident. Ta East 21st St. and Lonsdale Avenue -

Motor vehicle accident.

Number of routine cails: 9 Number of Code 3 emergency calis: 16 (3 chest pains, 3 seizures, 2 shortness of breath, 2 falls, 1 motor vehicle accident, | collapse, 4 other)

Nov. 22. Number of routine calls:'11 Number of Code 3 emergency calls: 16 (7 motor vehicle accidents, 2 collapses, 2 shortness of breath, 2 chest pains, 3 other)

Nov. 23 Number of routine calls: 14 Number of Code 3 emergency calls: 16 (4 motor vehicle accidents, 4 shortness of breath, 3 chest pains, 1 seizure, 1 industrial accident, | fall, | assault, t other)