HORSESHOE

THE FOLLOWING is a list of recent North Shore emer- Beney incidents:

«. Branswick Beach:

“NSLS was’ dispatched to assist four canoes: off Brunswich Beach. A citizen concerned with the safety of the canoeists out during storm

.°! conditions of 40 knot winds and 3-6.” ‘lv foot seas, madé the report, but upon ,

arriving on scene, the canoeists did Mot require any assistance.

- 1900. bik. Marine Dr. -Apartment fire - assist N.V. District. oe 2600-bik. Roseberry Ave. -. Water shut off required. .,

inglewood

WAL TIE LIOR ALE WAM EIAR PALL

2300-bik. Westhill. Lawn mower gas leak.

" Number of medical aid calls: 2

Number of false alarms: 2 Nov. 8 4000-bik. Rose Cres. Wires down. 6400-bik. Nelson Ave. Tree down on house. 1800-blik. Inglewood Ave. Tree down on road. 400-bik. Keith Rd. . Transformer fire/wires down. 5100-bik. Headland. Tree down on road. 100-blk. Park Royal. “People.stuck in elevator. 500-blk. Tyee. Tree down on house. 2000-blk. Lawson Ave. Wires down.

4400-bik. Stone Cres.

Electrical fire in tree. 4600-bik. North Piccadiliy. Tree down...

3600-bik. Mathers Ave.

Tree down.

NOTICE

4300-bik. Irwin Dr.

Garage fire. Number of medical aid calls: 1 Number of public service calls: |

Nov. 7

Number of routine calls: 3 Number of Code 3 emergency calls: 2 (1. CVA, | shortness of breath)

Nov. 8 Number of routine calls: 10 Number of Code 3 emergency calls: 1 (shortness of breath) |

Nov. 9 Number of routine calls: 7 Number of Code 3 emergency

calls: 4 (2 motor vehicle accidents, .

\ fall, 1 chest pains)

_ PUBLIC INFORMATION DROP-IN ‘WESTVIEW INTERCHANGE PROJECT

The Ministry of Transportation and Highways is planning to construct an interchange at the intersection of Westview Drive and the Upper Levels section of the Trans Canada Highway #1. You are invited to attend a public information drop-in to discuss this important highway improvement project.

Dates Wednesday, November 30, 1994 Time: 4:30 PM - 9:00 PM

Place: Larson Efementary Schoo! Gymmasium 2605 Larson, North Vancouver

Ministry siaff will be in attendance. Your comments and questions are welcome. For further information, please contact Leach Martell, Project Manager, Ministry of Transportation and Highways, 7818 - 6th Street, Burnaby, B.C. V3N 4N8, 660-8228 (telephone), 660-1826 (facsimile).

Frovince of

British Columbia

Ministry of Transportation

and Highways

Cypress Bow! Rd.

Driver struck barrier and rolled over, Approximately $8,000 dam- age. No injuries. Charges: driving too fast for road conditions.

Nov. 2 : Highway 1 and Taylor Way.

Eastbound vehicle’s hood flew

open causing driver to lose control.

Another vehicle stopped to assist, .

was struck by.another vehicle, causing ore vehicle to mount centre divider. Approximately $10,000 damage. No injuries. Charges: fol- lowing too close.

7 1400-bik. Berkley Rd.

Single family residential fire. Hoskins Ra. and Arborlynn.

Motor vehicle accident. 1500-blk. Fern St.

Motor vehicle accident. 1900-blk. Marine Dr.

Multi-family/highrise fire. 1700-blk, Marine Dr.

Investigation.

Number of medical aid calls: 5 Number of false alarms: 2

- Nev. 8 1100-bIk. Caledonia Ave.

Lines down, . 500-bik. West Kings Rd.

Natural gas leak.

Highway 1.

Motor vehicle accident. Number of medical aid calls: 5 Number of false alarms: 2 Number of public service calls: |

Nov. 7 1900-bIk. Rufus Dr. Smoke reported. Number of medical aid calls: 4 Number of false alarms: 4

Nov. &

100-bIk. Chesterfield Pi. Strong odor.

100-bik. West Esplanade. Car smoking.

900-blk. Shavington St. Power lines down.

1100-bIk. Heywoad St. Tree fire.

500-blk. Highway 1. Tree down.

Number of medical aid calla: 3 Number of false alarms: 8 >

Nov.7)

Number of routine calls: 4s” aa : Number of Code 3: emergency»: calls: 18 (6 shortness of. breaths, 3

chest, pains; 5 motor: vehicle acci-

dents,

1 fall, 1 pedestrian struck, 2... other) a ee eee

Number of Code 3 emergency calls: 23 (8 chest pains, 6 collapses,’ _ 3 shortness of breaths, I seizure, 2. motor vehicle accidents, 2 pedestri-"” ans struck, 1 other)

‘Nov. 9.

. Number of routine calls: 22.

Number of Code 3 emergency - calls: 12 (3 chest pains, 2 shortness | of breaths, 3 collapses, 1 motor... vehicle accident, ! fall, 1 Pedestrian struck, | other)

Business: 2000-bik. Kirkstone. ; Door pried. Stolen: IBM 386. hard-drive. - 300-bik. Mountain Hwy. Door pried. Stolen: three com- puters. 1800-bik. Weich St. Window smashed. Stoien: com- puter and laser printer. 1400-bik. Columbia. Front glass door smashed. Stolen: computer drive.

Residential: : §00-bik. Riverside Dr. :

Patio door forced open. Stolen: phone, CD player and video cas- sette recorder. 300-bik. East 14th St.

Padlock pried off. Stolen: BMX bike. 400-bik. West 3rd St.

Padlock pried off. Stolen: Honda mini-bike. 200-blk. West Sth St.

Rear window pried off. Stolen: stereo.