preparation, . statement. 986-6034 ‘aft 6pm. WESTERN ACCOUNTING Services. 922-4431 -.

BOOKKEEPER AVAIL, part-time fiex-

ible hra.. Reas rates. Ref's avail. 929- 5805,

ACCOUNTING & BOOKKEEPING services - eves or weekends. 921- ‘9424.

Cabinet Making

DENCOR WOODWORK . Ltd. Bookcases, wall units, custom built- ins. Fast & reliable. 987-8405, 929-

Carpets W. V. F. & APPLIANCES

Many ines of carpet carried. Free est. Al that’s needed is a phone call. Carpet your sundecks with artificial turf.

Carpet installation

CARPET & LINO installation, new &

used. Repairs, restretch. Reas rates. Call Leo. 987-6870. EXPERT CARPET installation. restretching & Free est.

repairs. Work guaranteed. Peter, 980-3127.

Carpentry

ELSON’S CONSTRUCTION All types of carpentry. 9 in finishing. Will work weekends. Very reliable, Free est. Call Barry, 988- 4981. WE SPECIALIZE IN ADDITIONS & REMODELLING G. FANTHORPE

. 988-4506

ADDITIONS, RENOVATIONS, carpentry, electrical, plumbing. Big or smal, we do them ail. Alan DeMay Builder, 988-8717.

25 YEARS experience in all types of construction, finishing. carpentry a specialty. Close association with other trades. 926-9836.

NORTH SHORE carpentry. remodelling. finishing, porches. stars. etc CaliGeome, 926-2256 PAUL-ADAM ENTERPRISES Ltd, est since 1969. Specializing in all forms of renovations & aiterations. Lge or small jobs. Framing & finishing carpentry, electrical, plumbing. Grywalling. cabinets & painting Residential & commercial Call.Ken tor tree est, 929-5818 or 929- 4727.

MORTGAGE HELPERS inlaw suites, basements. renova-

tions. Al types of finished carpentry 987-7734

NEED A good carpenter? Call Larry 326-3835

HOME IMPROVEMENTS Specializing in renovations, rumpus fooms, Dsmt stes, feature walls Ray 980-6771 of 880-4094 CARPENTERS AVAIL al low winter rates fo build fences. stairs, sundeck enctosures & do smalhrenovations

WEST COAST SUNDECKS LTD. 085-4026

NORTH GHORE CARPENTRY & RENOVATIONS Repairs, windows patio enclosures

deck painting 080-7427 aft 6pm

Ceramic Tiling

WILLIAMS TILE & WALLPAPER When

you cant afford to make mstaies call Wiham thats afl it fakes Gus 524 6681 res 6/4

5039 payor No 6647 of 872 2751

OLD COUNTRY THE, Patos & Steps & Batnvorfne All Other Tite Work YH6 1643 ogo 4626

NICK CRANES home “Apa: 6

fenovations Work guararhoed 56 6376

GUARANTEED INSTALLATION Supply & instal Les Scott 965 JA20 days

Cleaning

sateen aaa nee taete nee teeeeinsennennaiaamaannel

WILLIAMS WINDOW washing Most homes 320 inaide A oul 029 3329

COLOUR BRIGHT CARPET CARE Fali special: steam cleaning. Apt size

L.R., O.R., hall & 1 bdrm or sofa & chair, $84.95. SATISFACTION

GUARANTEED. 929-4583.

NORTH SHORE STEAM CLEANING CARPET & UPHOLSTERY Apt size, liv, din & hallway, $44.95. Free est. 926-6997, 988-8424. MOUNTAIN ENTERPRISES .

Complete home. cleaning services.

Residential. commercial. Also eavestrogghs, windows & gardening.

986-4082 aft 4pm.

PROFESSIONAL WINDOW &

GUTTER CLEANING

987-9889

LET CLEAN-AWAY do it for you! Thorough, professional houseciean- ing. For free est, call 926-0425

CHIMNEY CLEANING

& inspection. 987-6813 days. 988- 7936 eves.

MARTIN’S JANITORIAL Services Ltd. Specializing in all residential & commercial cleaning, filcor stripping & waxing, window & wall washing, carpet & office cleaning. 987- 5992. ae est.

GUARANTEED LUXURY CARPET & UPHOLSTERY CARE. Electro Static method. Recommended by many of Canada's teading carpet manufac- turers. Ask about our special. 922, 7082 -

DUTCH

HOME CLEANING SERVICES

Bonded & insured quality work. Reas rates. 987-6110. '

Concrete

CALLA BROS. Cement Contractors Ltd. Big or small we do them ail! Foundations - Floors - Patios Sidewaks - Concrete Construction All types of cancrete repairs Concrete pumping Sand and Gravel Office: 1455 Crown St, 985-6181 Home: eves, 988-9523

MORRISON CONCRETE LTD. Quality Concrete Placing and Finishing Foundations - Floors - Patios Orweways - Sidewalks Exposed Aggregate Compare our prices Phone 988-2840

SORENSEN BROS. CEMENT CONTRACTORS Foundations, Floors Patios, Driveways Sidewaks, Exposed Aggregate Forming & Gravel Work 988-0297 (bus), 985-3962 {res)

C & MW CONCRETE LTD. All types of concrete work Foundations - Floors - Patios Sidewalks - Driveways Exposed Aggregate Quatity work at competitive rates Bus. ph days or eves, 986-4511 MANOA CONCRETE Alb types of concrete work. driveways. carports. sidewalks, etc Free est 255-8010

MOUNTAIN CONCRETE, cement placing & finstiing. patios, sidewalks, driveways & basements 987-2628

Contracting

FUs) CONSTRUCTION LTD. Best of crews tor tast quality work Custom designed house Additions. renovations optan design services avail Reas rates Work guaranteed 922 9600

McIVOR CONSTRUCTION Renovations interior & extertor finishing, carports siding. decks & tences @26 7681

ASSOCIATED CONSTRUCTION RESOURCES Residential & commercial remodelling designing & inspection services Excelientref's 929-2902

PHEONIX CONSTRUCTION Genera! contracting, complete aitera tions renovations custom — built cabinets Hesidential & commercial Free est No job too small 929 7607

TERRY GARBUTT CONTRACTING Concrete Forming Framing Renovations Additons t stunates cost nothing 867-2630

RAM Painting & Renovations Don taell remodel Phone 986 1017 LORETTO CONSTRUCTION Bathims Unsemoents additions tube A saunas otc All guaranteed 820 7863 afl Opm

TAYLOM MADE HOMES Quality without compromise Destgners/bullders tor residential & commercial ceanovations alterations & addittons for tree ot Tete)

i ara

AWARD BUILDERS CORP Designers & builders of IMporavemMantis renovations Specializing © fine Custom finishing of all typos of remodeling joos 066.0475 FRAMING CONTRACTOR avail do renovations 601 1220

A.J CONTRACTING

No job too omali Special rate tor Senior Clitzena = Gathrms. renova tiona r6c nme extensions. otc GAA 68568 aft 4pm

trot work

ost hs

mall bveperver additions 4

wil

Complete ,senovations, interior

refinishidg, kitchens, etc. All trades yadest supplied. bath efficient. 922-8413.

Home Renovations Quality workmanship Ereeest. a 980-6588, ‘

@eewee

HANKO CONSTRUCTION RESIDENTIAL RENOVATIONS, ADDITIONS

CALL 985-2598 .

weecee JABETH CONTRACTING General

contracting, alterations. Estimate. No obliga obligatidns. Jim, 985-6600.

BASEMENT FINISHING remodelling. .

Exc rates. Free, est’s. 980-4044.

Bo

Drywali

i)

COMPLETE DRYWALL SERVICE Commercial & residential. Guaran- teed workmanship. 988-2531.

DORYWALL - GYPROC Plaster - repairs 25 year experience - 984-0017 anytime

“PACIFIC PLASTERING LTD” Stucco, drywall, plastering. No job too big or too smail. 298-4804, 980-

3157.

HOME DRYWALL - Application, taping & spraytex. Quality workmanship. No job too small. Clarke, 980-4757.

SMALL JOBS, taping, spraytex. Free est. 30 yrs experience. 985-7942. COMPLETE DRYWALL SERVICE SPECIAL ON TEXTURED CEILINGS Neat, professional & fast. Work guaranteed. 929-2535. QUALITY TAPING & Spraytex. Low tates. Any size job considered. Brian, 986-7871. FOR EXPERT drywall finishing, texture surfaces & painting. Phone Bob. 738-8915 aft 4pm.

, ell

ELECTRICAL REPAIRS & service

calls. new installations. Cail 929- 2405

Electrical

HEURING ELECTRIC Looking for more home owners & builders to add to the growing list of satisfied customers. Specializing in renovations & new construction 986-6758 FIAT LUX Electric. Specializmg in renovations, residential! & commercial construction. Emergency fighting & tire alarm systems. 986-3147 ECLIPSE LIGHTING & Design. Renovations, quality {fixtures & ac- cessories, in-home consultations 986-2772 (24 hrs) ELECTRICIAN, RETIRED of semt- retired, req'd immed to assist owner We need your intelligence only We will supply someone to fetch & cut holes, etc. 888-997 1 toca! 35. 926-6226 eves

Excavating

C&A EXCAVATING Hourly of contract 680 C backhoe loader Oraintite, rough tandscaping. excavating Aeas rates Seven days per week Randy. 986-8721

0&D EXCAVATING Owner operator of a case 5S80C backhoe Hourly of contract For protessional service & reas rates. call Oarry|, 988 2386

WILLIE'S BACKHOE SERVICE Trucking, backhoe. sewer & drains.

storm. sumps. water lines 967 9776

GARY'S EXCAVATING & Con tracting Lid Esttmates 980 9263

KLING BACKHOE SERVICE Big of small we do them afi Tren ching, dack filling landscaping Hourty of contract Rudy 986 1644

tit walt

Ce cumtmananesannan aansanannaatssmemmmamstuenerinsa:na name samessemaremnnsenennemeintaaapeeancineal

Fencing

RUSTIC FENCE Company Cedm fencing specialists for 20 yoare 966 3414

BUILD ALL TYPES of toncos & do COpans Also Cedur CH apostaha fencing aval 4 Mo to 6 1 tengtine

Heas cates 076 12168

nat Pests! 8) Flreplaces Eas

FIREPLACES A comptete installation service of fuel effigient heat circulation fireplaces Matthow Pierce Warmgtow frepiaces 086-8374

Classified lines are open Mon - Fri, 430 am. to8 p.m. Sat. 0am tof om Call 966-6222

_~

ry

Flooring

Floor sanding & fink plastics. Free est: 9BS BES? W, ¥.F. & APPLIANCES FLOORING DIVISION . 1395 MARINE OR, WEST VAN. 922-1204

Redo your kitchen with Sno or ting. Free est.

Furniture Refinishing

ANTIQUE RESTORATION 980-8231, 980-0297. See ow ad

LIONS GATE GLASS & SCREENS Your complete glass service shop. 950-1661, 840 West 15th St, Nosth

an

Gutters.

RESIDENTIAL HANDYMAN Services

- no job too small. Full est. Call aft 6pm, Joe 986-6034, Hendrick 327- 1538, 681-1555.

& painting. Cai 988-7055. HANDYMAN - CALL Sam. Fencing & repairs, painting, eavestrough cleaning & repairs,

windows, carpentry , 926-9241.

Heating

KERO-SUN PORTABLE heates. Heat for onty pennies an hour! 987-9211. LYNN VALLEY GENERAL REPAIRS

GAS CONVERSIONS Get $800 to get rd of your of CONVERT TO GAS & SAVE $33. McNER. PLBG & HTG LID. 986-1755 (24 HR ANS. SERV)

WESTSIDE MECHANICAL Heating & Gas Services. AB work ex pertly carried out Phone 885-2626

insulation

at

AB.C. ROOFING 4 INSULATION insadation of older homes, storm & thermal windows 067 6859

TNS WHOLESALE & RETAIL, Froo

catalogues Norbum Lighting Centro. 4600 E ast Hastings Cal 299-0666

Light Fixtures

Masonry

CHIMNEY EXPERT, 0049683 Repews. new tops repomnt) wate: proot roflash Froe est Gua work 25 ymexp Caliah 5

C&C MASONRY & LANDSCAPING Rock waks patos sidewawa Cedar acreen block & brick fencing Oraintios. turt

Cameoto 066 0701 o?R 4731

painting 4 -Engishman

Qually work, al types inci repars. Reas rates. Free ests. 926-2670.

ONE TON wak-in van. One man, $20 per tr: 2 men, $26 per tr. 987- 2591. 682-0511 pager 4108. NEW LIFE Recycling wil move you. Hourly rates. Walch us hustle. 986-

8041.

rates. Aval immed. 986-8608.

EXP PAINTER, free est. Professional workmanship. 987-1178.

est. 669-3022 (M-1). Ld. We de consnarted & residential exterior & interior paper hanging. 30 yrs exp. 929-4 136. QUALITY RESIDENTIAL interno:

erebiedt ihe by 11 on the North Shore. Howard Norow. 060-3265

M & M8 PAINTING & Decorating Free ost, reas rates. 985-9796

INTERIOR P. 1S¢ sq ft (paint inch) Free est 525-2832.

Paving

CURTIS PAVING

Ortveway & patchung experts Phone anytime tor a treé estimate 926 4814 922.2314

Plumbing

aferatons Niaht. day. 987 6947 TEO PLUMBING

We do plumiing work 4 smal

otectncal jobs Free ost Roan rates

0687 1644

PLUMBER, GASFITTER, Shore 066-5576 REPARIS TO paarinng 6 heatmy Cal fion Coates, 029 1950 PLUMBING, ALTERATIONS 4

for bathrms, aftchens etc free est 086 12745 eves

WESTSIDE MECHANICAL Pranting ropes & renewals fot pro mnt & efficient service phone 086 7626

North

Protessional Services

Domcom Semoes 020 1437

_A35- Wednesday, November 11, 1981 - North Shore News

DESIGN

ARCHITECTYRAL specializing in

otans prepared. Free est. 921 -9843- ACCOUNTING, BSOOKKEEPING Services - eves or weekends. 821-

9424.

roofing service,

cal CLARK'S SOORING L1D, 980- ABC. ROOFING

Tas 3 gravel cont aluminum guiters, shakes & duroid. Free est's. S87-

RSE ROOFING, N-VANLTD. Guaranteed quality : Personalized service. Free estimates. shakes.

984-0158. 985-4923.

HAVE ¥% ton, wil haul. Reas rates. Cai Ray, 922-9467.

NEW UFE ‘removes sub- bish. We charge by the minute & hus- tle. 986-4395.

GARDEN, RUBBISH, construction :& basement clean-up. Smal moving. For tast service, 986-4814. - = *?

W.V_F. & APPLIANCES FLOORING DIVISION 3395 MARINE DR, WEST VAM. 922-1204 Dress up your sundeck with artificial tut Ove 7 vaneties. Free est. SIERRA SUNDECK Co. Quafity designa & matertais. Cedar & vinyl coated decks. 880-6771 oa 980-4094.

Call me.

fm Catherine, one of the

classified Ad Visers at the North Shore News If you need some help writing your ad, just’ ask for me | your ad to work

wart

12 words $7.95

aa 986-6222

sunday =. news

north shore

news