a,

‘ad af

on ra

vee sites t

48 ~ Wednesday, July 21, 1993 ~ North Shore News

Thursday, ‘day, Saturday, and Sunday

MEOMIP IEDR EINE it

ka

eee cocuiccnsetet he ae)

t

‘7@ not completely ! ; U Nelied, Sears ied Ba them back. Inale oy te “ Special purchase! 8-program washer with Special purchasel 5-program dryer with Kenmore Challeng’ + H . eracludes clearance 200 3 water levels and 3 wash/rinse temperatures, plus Timed Heat, Timed Air, plus dry rack for shoes, drum

catalogue mercnandise ; fobric softener dispenser and Dua! Action’ agitator. #42270, lamp and easy-access larga door opening. #82270.

fo

Wie.

Twin set. Reg.1159.98

Lowes? price of the season on ‘Prestige’ sleep set with 1” of supersoft foam quilted to the cover far luxurious surface comfort. Choice of innerspring

or foam, 20-year warranty++. #73930 ser. Double set. Sears reg. 1379.98...$589 Queen set. Sears reg. 1599.98..$699

++Complete warranty dotuils at Sears Swin extra-long, 3/4, Queen 3:pc., King olso on sole Reg. prices shown are Sears prices

in Siere.

No payments until January 1994 on approved credit. Ask about our deferred payrnents plan on major appliances and furniture. SALE PRICES END SATURDAY, JULY 24, 1993, WHILE QUANTITIES LAST

SEARS

Expect more from Sears

SSPE A I RA SPAT U7 : Sears Canada Inc Satistaction guaranteed of money refunded. “Reg” ‘and “Was” refer to Sears Canada Inc. prices. There’s a Sears store near you... shep today at: Burnaby 433-3211, Sucrey 588-0811; Mon., Tues, and Sat. 9:30 a.m. to 5:30 p.m.; Wed., Thurs. and Fri. ‘til 9:00 p.m.; shop Sunday from 11:00 a.m. to 5.60 a.m. Richmond 278-5542 Mon. and Tues. 9:30 a.m. to 6:00 p.m.; Wed.. Thurs. and Fri, ‘til 9:00 p.m.; Sat. 9:30 a.m. to 5:30 p.m.; shop Sunday from 11:00 a.m. to 5:00 p.m. Capilano Mall 984-7722 Shop Mon., Tues., Wed. and Sat. 9:30 a.m. to 5:30 p.m.; Thurs. and Fri, ‘til 9:00 p.m.; shop Sunday from 11:00 a.m. to 5:00 p.m, Langley 533-4093 Mon., Tues., and Sal. 9:30 a.m. to 6:00 p.m.; Wed., Thurs. and Fri. ‘til 9:00 p.m.; shop Sunday {from 11:00 a.m. to 5:00 p.m.

(Car es spRPSOE ERASE SOAPS PSSA pe WR RSE, SPC PC SP sPAA? SD SSA EAC AAD AE AY SS