-. FINES totalling

~, $100,500 have been % : levied by the Workers

. Compensation Board |

tion list rece ord Is 23 inf ions 3 (cme: company’. receive fines) for non-compliance the province’s health and safe-2: <7. fy standards for the workplace cent companies < “(11 of 22) were repeat vila

ea backyard to playin.

neinucs sinessoge

ere

Orany of our: n nn the Lower Mainiand,:: Fraser Valley or Victoria