Bi6 - Sunday, March 21, 1982 - North Shore News

dip a> a> dh a> r |

Pj > <> dh a Sb OO AAA AAA AAAAAARARARAR A ARAR ARAB AR AAZAL

SERVICE INCLUDES:

1. ENGINE TUNE-UP Includes the following; Replace Spark Plugs, P.C.V. Valve, Fuel Filter, ‘Scope’ Test Ignition, Test Charging System and Service Emission Control System.

TTT eee

. CHECK FRONT WHEEL ALIGNMENT Inspect All Steering and Suspension Components. Road Test Vehicle.

_INSPECT ALL FOUR BRAKES and report condition.

“ad 4. ‘PRESSURE TEST’ COOLING SYSTEM Check all Hoses, Fan Belts and Water Pump.

MOST MAJOR CREDIT CARDS ACCrP”

oad Ready =

| Service ™

5. CHANGE ENGINE OIL & FILTER Lubricate Chassis Check all Fluid Levels, Inspect Exhaust !

System and Underbody Components Check and Adjust Tire Pressures.

PAKTIS LABOUK & TAX INCLUDED

Most Popular vehicies Motor homes extra Otter good March i5th to April JOth 1982

8:00 a rr

PLYMOUTH @ CHRYSLE!

i MARINE DRIVE eNORTEHEVANCOUNER BO NTP EEL (6004) 9%

4 weet Os tals Na A Se woah rset abe cannes a . eer? cell ae : ‘ - _— . ‘i ‘ ey SG Pea My 2 4, ae ‘¥ ah 7 Sie. S$ wo

SE SCE HOURS | ' 00 p.m., Mon.-Fri. : 8:00 arr, -

Qutopar,

- APPROVED AUTO REPAIR SERVICES

Facet

cee coLg

oe wasn Dy +

d > 4 F as LS,

: . .

Oo p.m., Saturday